DEFINITION MODULE SCRSHOM;

   (* EXPORT QUALIFIED SCRSHO; *)

   FROM NRMath IMPORT RealFunction;

   PROCEDURE SCRSHO(fx: RealFunction); 
   (*
     For interactive  CRT terminal use. Produce a crude graph of the function 
     fx over the interval x1 to x2. Query for another plot interval 
     until the user signals satisfaction.
   *)

END SCRSHOM.
